%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%                                               
%            Shizuoka University 
%       ----KANEKO & YAMASHITA LAB.----
%        Author: TSUCHIYA, Toru
%     File Name: rensyu15.tex
% Last Modified: Wed, 06 Jun 2007 16:50:11 +0900
%                                               
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\documentclass[a4j]{jarticle}

\begin{document}
ああああああああああああああああああああああああああああああああああああ
ああああああああああああああああ

\begin{table}[htbp]
\caption{試料作成時のスパッタリング条件}
\begin{center}
\begin{tabular}[t]{|l|c|r|p{4cm}|}
\hline
試料番号 & 圧力 [Pa] & 温度 [K] & 表面形態 \\ \hline
1 & 10 & 300 & 黒色。ガサガサ。\\
2 & 10 & 400 & 金属光沢。滑らか。\\
3 & 20 & 300 & \\
4 & 20 & 400 & 金属光沢。温度上昇のためか、粒界が見える。\\
\hline
\end{tabular}
\end{center}
\end{table}

ああああああああああああああああああああああああああああああああああああ
ああああああああああああああああああああああああ
\end{document}

